Index: diplomarbeit/Kapitel_2.tex
===================================================================
--- diplomarbeit/Kapitel_2.tex (revision 169)
+++ diplomarbeit/Kapitel_2.tex (revision 192)
@@ -81,3 +81,13 @@
 
 
+\section{Versuchsreihen zur definition eines Mikroemulsionssystems}
 
+\begin{figure}
+\includegraphics{Reihe 1}
+\caption{Reihe 1}
+\label{pic:Reihe 1}
+\end{figure}
+
+
+
+
